10^{-2} 10^{-1} 10^0 10^1 10^2

10^1

10^2

10^3

B (nT)

P-P Amplitude (mV/m)

Magnetic Field Strength Vs. P-P Amplitude of Tripolar Pulses For Various Regions of Earth Space

Auroral Zone Magnetosheath