0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 -25

-20

-15

-10

-5

0

5

10

15

20

25

Ey Antenna 0 kHz baseband 9.5 kHz bandwidth

5 dB 10 dB

SC 1 mV/m

* clipped data

2002-04-06 09:35:35.00 (GRT)

Seconds After Start