-40 -20 0 20 40

Epara [mV/m]

0 0.02 0.04 0.06 0.08 0.1 -40 -20 0 20 40

Eperp [mV/m]

time [sec from 04:59:34.79]

-40

-20

0

0 0.01 0.02 0.03 0.04 0.05 0.06 -40

-20

0

20

time [sec from 05:00:07.43]

c)

d) a)

b)