-10

0

Epara [mV/m]

-5

0

5

0 0.02 0.04 0.06 0.08 0.10 -5

0

5

time [sec from 04:59:35.20]

Eperp [mV/m]

0 0.02 0.04 0.06 0.08 0.10 -10

0

10

time [sec from 04:59:43.55]

a)

b)

c)

d)