04:40 05:00 05:20 -8

-5

-2

-vsp [V]

0

20

40

B [nT]

0

50

-50 0 50

θB [deg]

04:59:3004:59:4004:59:5005:00:0005:00:10 -4 -3 -2

a)

b)

c)

d)

e)

f)

04:59:35 04:59:40 -4 -2 0

-vsp [V] time [UT]