0 0.0045 0.009 0.0135 0.018 0.0225 0.027 0.0315 0.036 0.0405 0.045 -50

-40

-30

-20

-10

0

10

20

30

40

Ez Antenna 0 kHz baseband 19 kHz bandwidth

0 dB

SC 4 mV/m

* clipped data

2002-06-12 02:48:42.545 (GRT)

Seconds After Start