0 0.004 0.008 0.012 0.016 0.02 0.024 0.028 0.032 0.036 0.04 -50

-40

-30

-20

-10

0

10

20

30

40

Ez Antenna 0 kHz baseband 19 kHz bandwidth

0 dB

SC 2 mV/m

* clipped data

2002-06-12 02:51:47.77 (GRT)

Seconds After Start