0 0.005 0.01 0.015 0.02 0.025 0.03 0.035 0.04 0.045 0.05 -8

-6

-4

-2

0

2

4

6

8

Ey Antenna 0 kHz baseband 19 kHz bandwidth

15 dB

SC 1 mV/m

* clipped data

2002-05-14 11:39:31.12 (GRT)

Seconds After Start