TC1/2Spin/PA 0deg

TC1/2Spin/PA 15deg

TC1/2Spin/PA 30deg

TC1/2Spin/PA 45deg

TC1/2Spin/PA 60deg

TC1/2Spin/PA 75deg

TC1/2Spin/PA 90deg

TC1/2Spin/PA 105deg

TC1/2Spin/PA 120deg

TC1/2Spin/PA 135deg10^{-5}10^{-4}

ergs/cm**2-s-str-eV

dEFTC1/2Spin/PA 150deg

TC1/2Spin/PA 165deg10^{-5}10^{-4} dEFTC1/2Spin/PA 180deg10^{-5}10^{-4}

dEF10^210^310^4

Center Energy eV

10^210^310^4

2005/095

GseLat

GseLong

LMLT10

110^210^310^4

01:15

87.98

185.29

4.90

7.88

01:40

185.27

5.70

8.27

02:05

185.25

6.30

8.55

02:30

185.23

6.90

8.77246810

SCAN: 3000 - 25000

THETA: 0 - 180 ergs/cm**2-s integral energy flux

TC1/2Spin/PA 165deg

Sensor Data

0.80

0.84

0.88

0.92

0.96

1.00

Dimensionless

Unit vector

FGM Unit z TC-1