counts squared

0 250 500 750 1000

1250

Start: 2001-02-18 19:23:00.0 minutes

23.0 24.0 25.0 26.0 Interval: 240.0s

Cluster 3 dwp acf_stepped_zl [0,1312 ]

Cluster 3 dwp acf_stepped_nz

Start: 2001-02-18 19:23:00.0 Interval: 240.0s minutes

23.0 24.0 25.0 26.0

time[sec]

5E-05

0.0001

0.00015

0.0002

0.00025

0.0003

0.00035 counts squared []

10 15 20 25 30 35 40

ISDAT igr 2.0 isdat@engg101-165.engg.susx.ac.uk 2001-08-17 20:16:34.0 File: jole-2.ps

Particle Correlator Stepped Energy Zero -Lag (panel 1) non-zero lags (panel 2, no normalisation)

q0 = Cluster 3 dwp acf_stepped_zl (2.6.2.4.0) q4 = Cluster 3 dwp acf_stepped_nz (2.6.2.4.0) q8 = Cluster 3 dwp fft_stepped (2.6.2.4.0)