counts squared

0.25 0.5 0.75 1 1.25 1.5 1.75

Start: 2001-02-18 19:23:34.0 sec

5E-05 0.0001 0.00015 0.0002 0.00025 0.0003 Interval: 4.0s

Cluster 3 dwp acf_stepped_nz [0.221429,1.99286 ]

energy eV

63.1

64.57

66.07

67.61

69.18

70.79

72.44

74.13

75.86

Start: 2001-02-18 19:23:34.0 seconds

34.0 34.5 35.0 35.5 36.0 36.5 37.0 37.5 Interval: 4.0s

Cluster 3 dwp energy_stepped [63.0153,77.0187 eV] (log)

ISDAT igr 2.0 <init.igr> andrewb@engg101-165.engg.susx.ac.uk 2001-08-17 19:11:36.0 File: acf_line_plots_010218_192334.ps

Stepped Energy ACF (panel 1, 0 to 0.37 milliseconds) and corresponding energy (panel 2)

q0 = Cluster 3 dwp acf_stepped_nz (2.7.2.4.0) q4 = Cluster 3 dwp energy_stepped (2.7.2.4.0) q8 = Cluster 3 dwp energy_stepped (2.7.2.4.0) q12 = Cluster 3 dwp energy_fixed (2.7.2.4.0) q16 = Cluster 3 dwp energy_stepped (2.7.2.4.0)