counts squared

0.6 0.7 0.8 0.9 1 1.1 1.2 1.3

Start: 2001-02-18 19:23:30.0 sec

5E-05 0.0001 0.00015 0.0002 0.00025 0.0003 Interval: 4.0s

Cluster 3 dwp acf_stepped_nz [0.585695,1.38057 ]

energy eV

100 102.3

104.7

107.2

109.6

112.2

114.8

117.5

Start: 2001-02-18 19:23:30.0 seconds

30.0 30.5 31.0 31.5 32.0 32.5 33.0 33.5 Interval: 4.0s

Cluster 3 dwp energy_stepped [98.361,120.219 eV] (log)

ISDAT igr 2.0 <init.igr> andrewb@engg101-165.engg.susx.ac.uk 2001-08-17 19:11:15.0 File: acf_line_plots_010218_192330.ps

Stepped Energy ACF (panel 1, 0 to 0.37 milliseconds) and corresponding energy (panel 2)

q0 = Cluster 3 dwp acf_stepped_nz (2.7.2.4.0) q4 = Cluster 3 dwp energy_stepped (2.7.2.4.0) q8 = Cluster 3 dwp energy_stepped (2.7.2.4.0) q12 = Cluster 3 dwp energy_fixed (2.7.2.4.0) q16 = Cluster 3 dwp energy_stepped (2.7.2.4.0)