counts squared

0 4 8 12 16 20 24

Start: 2001-02-18 19:23:10.0 sec

5E-05 0.0001 0.00015 0.0002 0.00025 0.0003 Interval: 4.0s

Cluster 3 dwp acf_fixed_nz [0,24.1951 ]

counts squared

0.7 0.8 0.9 1 1.1 1.2

Start: 2001-02-18 19:23:10.0 sec

5E-05 0.0001 0.00015 0.0002 0.00025 0.0003 Interval: 4.0s

Cluster 3 dwp acf_stepped_nz [0.655589,1.26435 ]

energy eV

912 933.3 955 977.2

1000

1023

1047

1072

1096

Start: 2001-02-18 19:23:10.0 seconds

10.0 10.5 11.0 11.5 12.0 12.5 13.0 13.5 Interval: 4.0s

Cluster 3 dwp energy_stepped [902.69,1103.29 eV] (log)

ISDAT igr 2.0 <init.igr> andrewb@engg101-165.engg.susx.ac.uk 2001-08-17 18:57:02.0 File: acf_line_plots_010218_192310

Fixed Energy ACF (panel 1, 45 eV), Stepped Energy ACF (panel 2) and corresponding energy (panel 3)

q0 = Cluster 3 dwp acf_fixed_nz (2.7.2.4.0) q4 = Cluster 3 dwp acf_stepped_nz (2.7.2.4.0) q8 = Cluster 3 dwp energy_stepped (2.7.2.4.0) q12 = Cluster 3 dwp energy_fixed (2.7.2.4.0)

q16 = Cluster 3 dwp energy_stepped (2.7.2.4.0)