C1 LEEA PA 90deg

C1 HEEA PA 90deg10^{-5}

ergs/cm**2-s-str-eV

dEF2005/330

0100200300400500

Center Energy eV

12:49

12:51

12:53

12:55

12:57

12:59

13:01

13:03

13:05