C2 HEEA Zones 0-110^{-4}

ergs/cm**2-s-str-eV dEF10^{-4}

10^{-4}

C2 HEEA PA 90deg10^{-4} dEF10^310^4

Center Energy eV

169.8

170.0

170.2

170.4

170.6

170.8

Degrees angle

C2 B Theta

Sensor Data

10^310^4

%.0-1f

Degress

C2 JP Invariant Latitude

2003/205:0110^110^210^310^4

19:00

19:10

19:20

19:30

19:40

19:50

20:00