AKR

A-D03-48-1

02:003:004:005:006:007:008:00

GEAIL PWI SA y 20 Dy 141 1996

800 600 400 200 0 equeny (kHz) RE MT UT

15.758.3920.87

15.176.7421.08

14.584.6821.32

14.002.2821.60

13.42-0.3921.91

12.86-3.2222.26

12.32-6.1422.65

{